Gift Box - 200x200x50mm | Flat Size: 618x306mm
Finished Size   Crease   Bleed To avoid production delays, ensure artwork conforms to the following guidelines: One PDF both with and without cutter guide. PDF should be created in CMYK colour mode with crop marks and 3mm bleed. Fonts should be embeded or converted to outlines. Images should be 300dpi or higher.