Roller Banner - 1200mm | Flat Size: 1200x2100mm  /  Finished Size: 1200x2000mm
Finished Size   Bleed Area   Non Printed Area   Safe Area To avoid production delays, ensure artwork conforms to the following guidelines: One PDF with blank pages where no print is required. PDF should be created in CMYK colour mode with crop marks. Fonts should be embeded or converted to outlines. Images should be 300dpi or higher. Note: Ensure artwork is extended to the edge of the bleed area to avoid white edges when finished to size. Avoid placing content in the Non Printed Area, this is used to attach the banner to the base and will not be visible.

NON PRINT AREA